\begin{thebibliography}{10}
\expandafter\ifx\csname url\endcsname\relax
  \def\url#1{\texttt{#1}}\fi
\expandafter\ifx\csname urlprefix\endcsname\relax\def\urlprefix{URL }\fi
\expandafter\ifx\csname href\endcsname\relax
  \def\href#1#2{#2} \def\path#1{#1}\fi

\bibitem{cms}
P.~Adzic, et~al., {Results of the first performance tests of the CMS
  electromagnetic calorimeter}, Eur. Phys. J. C 44S1 (2006) 1--10.
\newblock \href {http://dx.doi.org/10.1140/epjcd/s2005-02-011-3}
  {\path{doi:10.1140/epjcd/s2005-02-011-3}}.

\bibitem{alice}
D.~D.V.~Aleksandrov, et~al., A high resolution electromagnetic calorimeter
  based on lead-tungstate crystals, Nuclear Instruments and Methods in Physics
  Research Section A: Accelerators, Spectrometers, Detectors and Associated
  Equipment 550~(1) (2005) 169--184.
\newblock \href {http://dx.doi.org/https://doi.org/10.1016/j.nima.2005.03.174}
  {\path{doi:https://doi.org/10.1016/j.nima.2005.03.174}}.

\bibitem{panda}
M.~Kavatsyuk, et~al., Performance of the prototype of the electromagnetic
  calorimeter for panda, Nuclear Instruments and Methods in Physics Research
  Section A: Accelerators, Spectrometers, Detectors and Associated Equipment
  648~(1) (2011) 77--91.
\newblock \href {http://dx.doi.org/https://doi.org/10.1016/j.nima.2011.06.044}
  {\path{doi:https://doi.org/10.1016/j.nima.2011.06.044}}.

\bibitem{hps}
I.~Balossino, et~al., The hps electromagnetic calorimeter, Nuclear Instruments
  and Methods in Physics Research Section A: Accelerators, Spectrometers,
  Detectors and Associated Equipment 854 (2017) 89--99.
\newblock \href {http://dx.doi.org/https://doi.org/10.1016/j.nima.2017.02.065}
  {\path{doi:https://doi.org/10.1016/j.nima.2017.02.065}}.

\bibitem{clas12}
A.~Acker, et~al., The clas12 forward tagger, Nuclear Instruments and Methods in
  Physics Research Section A: Accelerators, Spectrometers, Detectors and
  Associated Equipment 959 (2020) 163475.
\newblock \href {http://dx.doi.org/https://doi.org/10.1016/j.nima.2020.163475}
  {\path{doi:https://doi.org/10.1016/j.nima.2020.163475}}.

\bibitem{primex}
{JLab Experiment \textbf{E12-10-011}, A Precision Measurement of the $\eta$
  Radiative Decay Width via the Primakoff Effect}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/10/PR12-10-011.pdf}.

\bibitem{gluex_det}
S.~Adhikari, et~al., {The GLUEX beamline and detector}, Nucl. Instrum. Meth. A
  987 (2021) 164807.
\newblock \href {http://arxiv.org/abs/2005.14272} {\path{arXiv:2005.14272}},
  \href {http://dx.doi.org/10.1016/j.nima.2020.164807}
  {\path{doi:10.1016/j.nima.2020.164807}}.

\bibitem{nps}
T.~Horn, {A PbWO$_4$-based Neutral Particle Spectrometer in Hall C at 12 GeV
  JLab}, J. Phys. Conf. Ser. 587~(1) (2015) 012048.
\newblock \href {http://dx.doi.org/10.1088/1742-6596/587/1/012048}
  {\path{doi:10.1088/1742-6596/587/1/012048}}.

\bibitem{eic}
R.~Abdul~Khalek, et~al., {Science Requirements and Detector Concepts for the
  Electron-Ion Collider: EIC Yellow Report}\href
  {http://arxiv.org/abs/2103.05419} {\path{arXiv:2103.05419}}.

\bibitem{jef}
{JLab Experiment \textbf{E12-12-002}, Eta Decays with Emphasis on Rare Neutral
  Modes: The JLab Eta Factory (JEF) Experiment}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/14/PR12-14-004.pdf}.

\bibitem{e12-13-010}
{JLab experiment \textbf{E12-13-010}, Exclusive Deeply Virtual Compton and
  Neutral Pion Cross-Section Measurements in Hall C}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/13/PR12-13-010.pdf}.

\bibitem{e12-06-114}
{JLab experiment \textbf{E12-06-114}, Measurements of the Electron-Helicity
  Dependent Cross Sections of Deeply Virtual Compton Scattering with CEBAF at
  12 GeV}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/06/PR12-06-114.pdf}.

\bibitem{e12-13-007}
{JLab experiment \textbf{E12-13-007}, Measurement of SemiInclusive $\pi^0$
  Production as Validation of Factorization }, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/13/PR12-13-007.pdf}.

\bibitem{e12-14-003}
{JLab experiment \textbf{E12-14-003}, Wide-angle Compton Scattering at 8 and 10
  GeV Photon Energies}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/14/PR12-14-003.pdf}.

\bibitem{e12-17-008}
{JLab experiment \textbf{E12-17-008}, Polarization Observables in Wide-Angle
  Compton Scattering at large $s$, $t$, and $u$}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/17/PR12-17-008.pdf}.

\bibitem{e12-14-005}
{JLab experiment \textbf{E12-14-005}, Wide Angle, Exclusive Photoproduction of
  $\pi^0$ Mesons}, available oline:
  \url{https://www.jlab.org/exp_prog/proposals/14/PR12-14-005.pdf}.

\bibitem{hycal_kubantsev}
M.~Kubantsev, I.~Larin, A.~Gasparian, {Performance of the PrimEx
  electromagnetic calorimeter}, AIP Conf. Proc. 867~(1) (2006) 51--58.
\newblock \href {http://arxiv.org/abs/physics/0609201}
  {\path{arXiv:physics/0609201}}, \href {http://dx.doi.org/10.1063/1.2396938}
  {\path{doi:10.1063/1.2396938}}.

\bibitem{hycal_gasparian}
A.~Gasparian, {A high performance hybrid electromagnetic calorimeter at
  Jefferson Lab}, in: {11th International Conference on Calorimetry in
  High-Energy Physics (Calor 2004)}, 2004.

\bibitem{eljen}
{Eljen Technology, Organic Scintillators}, available oline:
  \url{https://eljentechnology.com}.

\bibitem{popov}
V.~{Popov}, H.~{Mkrtchyan}, New photomultiplier active base for hall c
  jefferson lab lead tungstate calorimeter, in: 2012 IEEE Nuclear Science
  Symposium and Medical Imaging Conference Record (NSS/MIC), 2012, pp.
  1177--1179.
\newblock \href {http://dx.doi.org/10.1109/NSSMIC.2012.6551294}
  {\path{doi:10.1109/NSSMIC.2012.6551294}}.

\bibitem{fadc250}
F.~Barbosa, et~al., {A VME64x, 16-Channel, Pipelined 250 MSPS Flash ADC With
  Switched Serial (VXS) Extension}, Tech. rep., Jefferson Lab,
  \href{https://halldweb.jlab.org/doc-public/DocDB/ShowDocument?docid=1022}{Technical
  Report GlueX-doc-1022} (hyperlink) (Apr. 2007).

\bibitem{root}
R.~Brun, F.~Rademakers, {ROOT: An object oriented data analysis framework},
  Nucl. Instrum. Meth. A 389 (1997) 81--86.
\newblock \href {http://dx.doi.org/10.1016/S0168-9002(97)00048-X}
  {\path{doi:10.1016/S0168-9002(97)00048-X}}.

\bibitem{ps}
F.~Barbosa, C.~Hutton, A.~Sitnikov, A.~Somov, S.~Somov, I.~Tolstukhin, {Pair
  spectrometer hodoscope for Hall D at Jefferson Lab}, Nucl. Instrum. Meth. A
  795 (2015) 376--380.
\newblock \href {http://dx.doi.org/10.1016/j.nima.2015.06.012}
  {\path{doi:10.1016/j.nima.2015.06.012}}.

\bibitem{l1_trigger}
A.~Somov, {Development of level-1 triggers for experiments at Jefferson Lab},
  AIP Conf. Proc. 1560~(1) (2013) 700--702.
\newblock \href {http://dx.doi.org/10.1063/1.4826876}
  {\path{doi:10.1063/1.4826876}}.

\bibitem{geant}
J.~Allison, et~al., Recent developments in geant4, Nuclear Instruments and
  Methods in Physics Research Section A: Accelerators, Spectrometers, Detectors
  and Associated Equipment 835 (2016) 186--225.
\newblock \href {http://dx.doi.org/https://doi.org/10.1016/j.nima.2016.06.125}
  {\path{doi:https://doi.org/10.1016/j.nima.2016.06.125}}.

\bibitem{pmt_high_rate}
F.~Barbosa, et~al., {Characterization of the NPS and CCAL readout }, Tech.
  rep., Jefferson Lab, {GlueX-doc-3272, (2017),
  \url{https://halldweb.jlab.org/doc-public/DocDB/ShowDocument?docid=3272}.}

\bibitem{fcal_clust}
R.~T. Jones, et~al., {A bootstrap method for gain calibration and resolution
  determination of a lead-glass calorimeter}, Nucl. Instrum. Meth. A 566 (2006)
  366--374.
\newblock \href {http://dx.doi.org/10.1016/j.nima.2006.07.061}
  {\path{doi:10.1016/j.nima.2006.07.061}}.

\bibitem{gams}
A.~Lednev, {Separation of the overlapping electromagnetic showers in the
  cellular gams-type calorimeters.}, Tech. rep., IHEP Protvino, {Preprint IHEP
  (1993) 93-153}.

\bibitem{gams1}
F.~Binon, et~al., {Hodoscope multi-photon spectrometer GAMS-2000}, Nucl.
  Instrum. Meth. A 248 (1986) 86.
\newblock \href {http://dx.doi.org/10.1016/0168-9002(86)90501-2}
  {\path{doi:10.1016/0168-9002(86)90501-2}}.

\bibitem{fcal_base}
A.~Brunner, et~al., {A Cockcroft-Walton base for the FEU84-3 photomultiplier
  tube}, Nucl. Instrum. Meth. A 414 (1998) 466--476.
\newblock \href {http://dx.doi.org/10.1016/S0168-9002(98)00651-2}
  {\path{doi:10.1016/S0168-9002(98)00651-2}}.

\bibitem{tosca}
O.~Glamazdin, {TOSCA simulation of the magnetic shielding of the FCAL insert },
  Tech. rep., Jefferson Lab, {GlueX-doc-3561, (2018),
  \url{https://halldweb.jlab.org/doc-private/DocDB/ShowDocument?docid=3561}.}

\bibitem{fnal_pmt}
W.~Koska, S.~W. Delchamps, J.~Freeman, W.~Kinney, D.~Lewis, P.~Limon,
  J.~Strait, I.~Fiori, M.~Gallinaro, Q.~Shen, {Evaluation of candidate
  photomultiplier tubes for the upgrade of the CDF end plug calorimeter}, Nucl.
  Instrum. Meth. A 406 (1998) 103--116.
\newblock \href {http://dx.doi.org/10.1016/S0168-9002(97)01193-5}
  {\path{doi:10.1016/S0168-9002(97)01193-5}}.

\bibitem{pwo_crystals}
T.~Horn, et~al., {Scintillating crystals for the Neutral Particle Spectrometer
  in Hall C at JLab}, Nucl. Instrum. Meth. A 956 (2020) 163375.
\newblock \href {http://arxiv.org/abs/1911.11577} {\path{arXiv:1911.11577}},
  \href {http://dx.doi.org/10.1016/j.nima.2019.163375}
  {\path{doi:10.1016/j.nima.2019.163375}}.

\end{thebibliography}
