hnew Entries 228888 Mean 277.3 RMS 125

200 400 600 800 1000 1200 1400 1600 0

200

400

600

800

1000

1200

<mu> = 0.800392 +/- 0.005567

SiPM response: Random Trigger^{hnew}_{Entries -93107}

Mean 774.9 RMS 351.2

200 400 600 800 1000 1200 1400 1600 1800 2000 0 20 40 60 80 100 120 140 160 180 200 220 hnew Entries -93107

<mu> = 4.175375 +/- 0.021540 <mu> = 3.374983 +/- 0.022248

SiPM response: Sr90 Scint. Trigger

adc5 Entries 135775 Mean 708.1 RMS 352.5

200 400 600 800 1000 1200 1400 1600 0 20 40 60 80 100 120 140 160 180 200 220 adc[0] Sr90 trigger