Bcal resolution parameters

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.05 0.1 0.15 0.2 Energy (GeV)

ΔE/E

DR= 80000000 PDE= 0.2

Total Sampling Floor Stat

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.05 0.1 0.15 0.2 Energy (GeV)

ΔE/E

DR= 80000000 PDE= 0.1

Total Sampling Floor Stat

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.05 0.1 0.15 0.2 Energy (GeV)

ΔE/E

DR= 40000000 PDE= 0.2

Total Sampling Floor Stat

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.05 0.1 0.15 0.2 Energy (GeV)

ΔE/E

DR= 40000000 PDE= 0.1

Total Sampling Floor Stat

Bcal resolution parameters

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.2 0.4 0.6 0.8 1 Energy (GeV)

ΔE/E

DR= 80000000 PDE= 0.2

Total Sampling Floor Stat

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.2 0.4 0.6 0.8 1 Energy (GeV)

ΔE/E

DR= 80000000 PDE= 0.1

Total Sampling Floor Stat

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.2 0.4 0.6 0.8 1 Energy (GeV)

ΔE/E

DR= 40000000 PDE= 0.2

Total Sampling Floor Stat

0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 0.8

0 0.2 0.4 0.6 0.8 1 Energy (GeV)

ΔE/E

DR= 40000000 PDE= 0.1

Total Sampling Floor Stat